; REAMP
;---------------------------------------------------------------
;! modifies UV data re-scaling the amplitudes
;# Task UV CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 2005
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
REAMP     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
REAMP     Scales uv fluxes
INNAME                             Input UV file name (name)
INCLASS                            Input UV file name (class)
INSEQ             0.0     9999.0   Input UV file name (seq. #)
INDISK            0.0        9.0   Input UV file disk unit #
OUTNAME                            Output UV file name (name)
OUTCLASS                           Output UV file name (class)
OUTSEQ           -1.0     9999.0   Output UV file name (seq. #)
OUTDISK           0.0        9.0   Output UV file disk unit #.
FACTOR                             Scale factor
----------------------------------------------------------------
REAMP
Task:  This task will rescale uv data by a user-supplied factor
       including correcting the weights.

Adverbs:
  INNAME.....Input UV file name (name).      Standard defaults.
  INCLASS....Input UV file name (class).     Standard defaults.
  INSEQ......Input UV file name (seq. #).    0 => highest.
  INDISK.....Disk drive # of input UV file.  0 => any.
  OUTNAME....Output UV file name (name).     Standard defaults.
  OUTCLASS...Output UV file name (class).    Standard defaults.
  OUTSEQ.....Output UV file name (seq. #).   0 => highest unique
  OUTDISK....Disk drive # of output UV file. 0 => highest with
             space for the file.
  FACTOR.....Scale visibilities by FACTOR and divide weights by
             FACTOR squared.  0 -> error
----------------------------------------------------------------
