; IMAGE-UTIL
;---------------------------------------------------------------
;! Information about IMAGE-UTIL
;# INFORMATION GENERAL
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 1997-1999, 2001-2005
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
IMAGE-UTILLLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
List of verbs, adverbs, tasks in category IMAGE-UTIL

BDROP      gives number of pooints dropped at the beginning
BSGEO      Beam-switched Az-El image to RA-Dec image translation
CALWR      writes calibrator images w CC files to FITS disk files
DOMODEL    selects display of model function
DORESID    selects display of differences between model and data
DOSLICE    selects display of slice data
EDROP      number of points/iterations to be omitted from end of process
FIT2A      reads the fits input file and records it to the output ascii file
FITAB      writes images / uv data w extensions to tape in FITS format
FITDISK    writes images / uv data w extensions to disk in FITS format
FITTP      writes images / uv data w extensions to tape in FITS format
HLPTVHUI   Interactive intensity-hue-saturation display - on-line help
HLPTVRGB   Interactive red-green-blue display - on-line help
IMCLP      Clip an image to a specified range.
IMLOD      reads tape to load images to disk
OGEOM      Simple image rotation, scaling, and translation
OHGEO      Geometric interpolation with correction for 3-D effects
READISK    writes images / uv data w extensions to tape in FITS format
WRTDISK    writes images / uv data w extensions to tape in FITS format
WRTPROCS   Procedures to simplify the reduction of VLBA data
