; VLA
;---------------------------------------------------------------
;! Information about VLA
;# INFORMATION GENERAL
;-----------------------------------------------------------------------
;;  Copyright (C) 1995-1999, 2003-2004, 2006-2008, 2010
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
VLA       LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
List of verbs, adverbs, tasks in category VLA

APGPS      Apply GPS-derived ionospheric corrections
BDF2AIPS   script access to obit task BDFIn to translate EVLA data to AIPS
BDFLIST    script access to obit task ASDMList to list contents of ASDM data
BREAK      procedure to TELL FILLM to break all current uv files, start new
CALDIR     lists calibrator models available as AIPS FITS files
CALIN      specifies name of input disk file usually with calibration data
CLCOR      applies user-selected corrections to the calibration CL table
CVEL       shifts spectral-line UV data to a given velocity
DAYFX      Fixes day number problems left by FILLM
DFCOR      applies user-selected corrections to the calibration CL table
FARAD      add ionospheric Faraday rotation to CL table
FEW        procedure to TELL FILLM to append incoming data to existing uv files
FILLM      reads VLA on-line/archive format uv data tapes (post Jan 88)
FIXAL      least squares fit aliasing function and remove
FLOPM      reverses the spectral order of UV data, can fix VLA error
FRMAP      Task to build a map using fringe rate spectra
FXALIAS    least squares fit aliasing function and remove
GPSDL      Calculate ionospheric delay and Faraday rotation corrections
LDGPS      load GPS data from an ASCII file
MANY       procedure to TELL FILLM to start new uv files on each scan
MAPBM      Map VLA beam polarization
QUIT       procedure to TELL FILLM to stop at the end of the current scan
REWAY      computes weights based in rms in spectra
STOP       procedure to TELL FILLM to break all current uv files and stop
TECOR      Calculate ionospheric delay and Faraday rotation corrections
TELFLM     procedure to TELL real-time FILLM a new APARM(1) value
TYAPL      undoes and re-does nominal sensitivity application
TYSMO      smooths and filters a calibration TY or SY table
USERLIST   Alphabetic and numeric list of VLA users, points to real list
VLABP      VLA antenna beam polarization correction for snapshot images
VLANT      applies VLA antenna position corrections from OPs files
VLAPROCS   Procedures to simplify the reduction of VLBA data
VLARUN     calibrating amplitude and phase, and imaging VLA data
VLATECR    Calculate ionospheric delay and Faraday rotation corrections
