; FLOPM
;---------------------------------------------------------------
;! reverses the spectral order of UV data, can fix VLA error
;# Task UV VLA
;-----------------------------------------------------------------------
;;  Copyright (C) 2007-2010
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
FLOPM     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
FLOPM     Reverses order of spectra in UV data, fixes VLA error
INNAME                             Input UV file name (name)
INCLASS                            Input UV file name (class)
INSEQ             0.0     9999.0   Input UV file name (seq. #)
INDISK            0.0        9.0   Input UV file disk unit #
SOURCES                            Source name
QUAL            -10.0              Calibrator qualifier -1=>all
CALCODE                            Calibrator code '    '=>all
TIMERANG                           Time range to correct
SELBAND                            Bandwidth to select (kHz)
SELFREQ                            Frequency to select (MHz)
FREQID                             Freq. ID to select.
SUBARRAY          0.0     1000.0   Sub-array, 0=>all
BIF                                Low IF number to do
EIF                                Highest IF number to do
DOCALIB          -1.0      101.0   > 0 calibrate data & weights
                                   > 99 do NOT calibrate weights
GAINUSE                            CL (or SN) table to apply
DOPOL            -1.0       10.0   If >0.5 correct polarization.
PDVER                              PD table to apply (DOPOL>0)
BLVER                              BL table to apply.
FLAGVER                            Flag table version
DOBAND           -1.0       10.0   If >0.5 apply bandpass cal.
                                   Method used depends on value
                                   of DOBAND (see HELP file).
BPVER                              Bandpass table version
SMOOTH                             Smoothing function. See
                                   HELP SMOOTH for details.
DOACOR                             Include autocorrelations?
OPTYPE                             'VLAE' => correct VLA error
                                             in sidebanding
                                   'IFTO' => flop IFs also
OUTNAME                            Output UV file name (name)
OUTCLASS                           Output UV file name (class)
OUTSEQ           -1.0     9999.0   Output UV file name (seq. #)
OUTDISK           0.0        9.0   Output UV file disk unit #.
----------------------------------------------------------------
FLOPM
Task:  This task, in general, reverses the order of the FREQ axis.
       The IF order may be reversed as well.

       For special OPTYPE='VLAE', this task corrects for data taken by
       the VLA with incorrect sidelobe information in the control
       computer.  It reverses the order of the spectral channel and
       inverts the sign of the phase.  Note - if you have any
       calibration or flagging already done for the input data set,
       these tables must be applied.  Most tables will not be copied
       to the output data set.  This error was short-lived on the VLA
       in the early post-ModComp era and we hope it will be corrected
       in the archive so that this task will remain a curiosity rather
       than a workhorse.

       Other OPCODEs allow the reversal of spectral order if needed.
       On OPTYPE 'IFTO' which also flops the order of the OFs, all CL,
       SU, FG, and FQ tables are copied and corrected, so it would not
       be a good idea to set DOCAL true or FLAGVER >= 0 in that case.
       On other OPTYPEs, it is a good idea to apply the CL and FG
       tables and on all OPTYPEs any BP tables should be applied.

Adverbs:
  INNAME.....Input UV file name (name).      Standard defaults.
  INCLASS....Input UV file name (class).     Standard defaults.
  INSEQ......Input UV file name (seq. #).    0 => highest.
  INDISK.....Disk drive # of input UV file.  0 => any.
  SOURCES....Source to be copied.   '  '=> all; if any starts with a
             '-' then all except ANY source named.
  QUAL.......Qualifier of source to be copied. -1 => all.
  CALCODE....Calibrator code of sources to copy. ' '=> all.
  TIMERANG...Time range of the data to be corrected.  ALL DATA TIMES
             ARE COPIED.  In order: Start day, hour, min. sec, end
             day, hour, min. sec. Days relative to ref. date.
  SELBAND....Bandwidth of data to be selected. If more than one IF is
             present SELBAND is the width of the first IF required.
             Units = kHz. For data which contain multiple
             bandwidths/frequencies the task will insist that some form
             of selection be made by frequency or bandwidth.
  SELFREQ....Frequency of data to be selected. If more than one IF is
             present SELFREQ is the frequency of the first IF required.
             Units = MHz.
  FREQID.....Frequency identifier to select (you may determine which is
             applicable from the OPTYPE='SCAN' listing produced by
             LISTR). If either SELBAND or SELFREQ are set, their values
             override that of FREQID.  However, setting SELBAND and
             SELFREQ may result in an ambiguity.  In that case, the task
             will request that you use FREQID.
  SUBARRAY...Sub-array number to copy. 0=>all.
  BIF........First IF to include.  0 -> 1.
  EIF........Last IF to include.   0 -> max.
  DOCALIB....If true (>0), calibrate the data using information in the
             specified Cal (CL) table for multi-source or SN table for
             single-source data.  Also calibrate the weights unless
             DOCALIB > 99 (use this for old non-physical weights).
  GAINUSE....version number of the CL table to apply to multi-source
             files or the SN table for single source files.
             0 => highest.
  DOPOL......If > 0 then correct data for instrumental polarization as
             represented in the AN or PD table.  This correction is
             only useful if PCAL has been run or feed polarization
             parameters have been otherwise obtained.  See HELP DOPOL
             for available correction modes: 1 is normal, 2 and 3 are
             for VLBI.  1-3 use a PD table if available; 6, 7, 8 are
             the same but use the AN (continuum solution) even if a PD
             table is present.
  PDVER......PD table to apply if PCAL was run with SPECTRAL true and
             0 < DOPOL < 6.  <= 0 => highest.
  BLVER......Version number of the baseline based calibration (BL) table
             to apply. <0 => apply no BL table, 0 => highest.
  FLAGVER....specifies the version of the flagging table to be applied.
              0 => highest numbered table.
             <0 => no flagging to be applied.
  DOBAND.....If true (>0) then correct the data for the shape of the
             antenna bandpasses using the BP table specified by BPVER.
             The correction has five modes:
             (a) if DOBAND=1 all entries for an antenna in the table
             are averaged together before correcting the data.
             (b) if DOBAND=2 the entry nearest in time (including
             solution weights) is used to correct the data.
             (c) if DOBAND=3 the table entries are interpolated in
             time (using solution weights) and the data are then
             corrected.
             (d) if DOBAND=4 the entry nearest in time (ignoring
             solution weights) is used to correct the data.
             (e) if DOBAND=5 the table entries are interpolated in
             time (ignoring solution weights) and the data are then
             corrected.
             IMAGR uses DOBAND as the nearest integer; 0.1 is therefore
             "false".
  BPVER......Specifies the version of the BP table to be applied
                0 => highest numbered table.
               <0 => no bandpass correction to be applied.
  SMOOTH.....Specifies the type of spectral smoothing to be applied to
             a uv database . The default is not to apply any smoothing.
             The elements of SMOOTH are as follows:
             SMOOTH(1) = type of smoothing to apply: 0 => no smoothing
               To smooth before applying bandpass calibration
                 1 => Hanning, 2 => Gaussian, 3 => Boxcar, 4 => Sinc
               To smooth after applying bandpass calibration
                 5 => Hanning, 6 => Gaussian, 7 => Boxcar, 8 => Sinc
             SMOOTH(2) = the "diameter" of the function, i.e. width
               between first nulls of Hanning triangle and sinc
               function, FWHM of Gaussian, width of Boxcar. Defaults
               (if < 0.1) are 4, 2, 2 and 3 channels for SMOOTH(1) =
               1 - 4 and 5 - 8, resp.
             SMOOTH(3) = the diameter over which the convolving
               function has value - in channels.  Defaults: 1,3,1,4
               times SMOOTH(2) used when input SMOOTH(3) < net
               SMOOTH(2).
  DOACOR.....> 0 => include autocorrelations as well as cross
             correlation data.
  OPTYPE.....'VLAE' - leave header info unchanged, reverse order of
                      spectral channels, reverse sign of phase
             'IFTO' - Correct header (ref pixel and increment) and FQ
                      table, reverse order of spectral channels,
                      reverse order of IFs.
             other  - Correct header (ref pixel and increment) and FQ
                      table, reverse order of spectral channels.
  OUTNAME....Output UV file name (name).     Standard defaults.
  OUTCLASS...Output UV file name (class).    Standard defaults.
  OUTSEQ.....Output UV file name (seq. #).   0 => highest unique
  OUTDISK....Disk drive # of output UV file. 0 => highest with space
             for the file.
----------------------------------------------------------------
