; NORMALIZ
;---------------------------------------------------------------
;! specifies the type of gain normaliztion if any
;# ADVERB CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 2010-2011
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
normaliz  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
NORMALIZ
Type: Adverb  (Scalar)
Use:  This adverb specifies the type of gain normalization to be used.

Null value:  0 => None (CALIB), global if previously done (xxSMO)

Tasks:
  CALIB.....Determines antenna calibration: complex gain.  NORMALIZ
            overrides previous CPARM(2) to mean 1 global, 2 by
            subarray, 3 by subarray,IF, and 4 by subarray,IF,pol
  SNSMO.....Smooths and filters a calibration SN table.  NORMALIZ < 0
            means do not change the global normalization, 0 means
            change it if it was previously not 1.0, > 0 means set it
  CLSMO.....Smooths a calibration CL table.  NORMALIZ as for SNSMO.
----------------------------------------------------------------
