; PCFIT
;---------------------------------------------------------------
;! Finds delays and phases using a PC table
;# Task SPECTRAL UV CALIBRATION PLOT VLBI
;-----------------------------------------------------------------------
;;  Copyright (C) 2016
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
PCFIT     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
PCFIT     Fits pulse-cal tables for delay and phase
INNAME                             Input UV file name (name)
INCLASS                            Input UV file name (class)
INSEQ             0.0     9999.0   Input UV file name (seq. #)
INDISK            0.0        9.0   Input UV file disk unit #
INVERS            0.0              Table version to plot
FREQID            0.0              Frequency ID code to plot.
SUBARRAY          0.0              Subarray to plot; 0 => 1
TIMERANG                           Range of times to include
NPIECE            0.0        90.0  Number of delays fit in each
                                   polarization, antenna, time
OPTYPE                             'TOTA' -> write total delays
                                   and phases, else write delay
                                   and phase differenced from
                                   first time
PRTLEV            0.0              > 0   print solutions,
                                   > 1.5 print initial guesses
----------------------------------------------------------------
PCFIT
Type:  Task
Use:   To fit delays and phases to PC-table data, writing a new SN
       table and a new PC table, the latter containing the residual PC
       values after the fit delays and phases are subtracted.

Adverbs:
  INNAME.....Input UV file name (name).      Standard defaults.
  INCLASS....Input UV file name (class).     Standard defaults.
  INSEQ......Input UV file name (seq. #).    0 => highest.
  INDISK.....Disk drive # of input UV file.  0 => any.
  INVERS.....Specifies the version of the PC table to be read as
             input.   0 -> highest.
  FREQID.....Specifies which frequency ID to fit.  0 => 1.
  SUBARRAY...The subarray number to be fit.  0 => 1.
  TIMERANG...Time range to be fit: start day, hour, min, sec, end day,
             hour, min, sec.
  NPIECE.....Break up IFs into NPIECE pieces for fit: 0 -> Number of
             IFs in PC table.  1 -> fit one delay to all IFs, 2 -> fit
             one delay to the first half of the IFs and a second to
             the second half, and so on.
  OPTYPE.....'TOTA' => write the delays and phases as they are fit to
             the PC table data.  Otherwise, write the current fit
             minus the values from the first time.
  PRTLEV.....> 0 -> print solutions with errors
             > 1.5 -L also print initial guess going into fitter
----------------------------------------------------------------
