; PHSRF
;---------------------------------------------------------------
;! Perform phase-referencing within a spectral line database.
;# Task UV
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2000, 2008, 2010
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
PHSRF     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
PHSRF     Performs spectral phase-referencing
INNAME                             Input UV file name (name)
INCLASS                            Input UV file name (class)
INSEQ             0.0     9999.0   Input UV file name (seq. #)
INDISK            0.0        9.0   Input UV file disk unit #
SOURCES                            Source name
QUAL            -10.0              Calibrator qualifier -1=>all
CALCODE                            Calibrator code '    '=>all
TIMERANG                           Time range to use
SELBAND                            Bandwidth to select (kHz)
SELFREQ                            Frequency to select (MHz)
FREQID                             Freq. ID to select.
SUBARRAY          0.0     1000.0   Sub-array, 0=>all
DOCALIB          -1.0      101.0   > 0 calibrate data & weights
                                   > 99 do NOT calibrate weights
GAINUSE                            CL (or SN) table to apply
DOPOL            -1.0       10.0   If >0.5 correct polarization.
PDVER                              PD table to apply (DOPOL>0)
BLVER                              BL table to apply.
FLAGVER                            Flag table version
DOBAND           -1.0       10.0   If >0.5 apply bandpass cal.
                                   Method used depends on value
                                   of DOBAND (see HELP file).
BPVER                              Bandpass table version
SMOOTH                             Smoothing function. See
                                   HELP SMOOTH for details.
DOACOR                             Include autocorrelations?
OUTNAME                            Output UV file name (name)
OUTCLASS                           Output UV file name (class)
OUTSEQ           -1.0     9999.0   Output UV file name (seq. #)
OUTDISK           0.0        9.0   Output UV file disk unit #.
OPCODE                             'PHSR' - will rotate phases
                                           of all channels by
                                           phases of reference
                                           channel(s).
                                   'A&P'  - same as PHSR but
                                           also divides by
                                           amplitude of ref
                                   'PHBL' - same as PHSR but
                                           write results into
                                           BL table.
                                   'APBL' - same as A&P but
                                           write results into
                                           BL table.
                                   ' ' => 'PHSR'
ICHANSEL                           Array of start and stop chan
                                   numbers, plus a channel
                                   increment and IF to define
                                   reference channels.
----------------------------------------------------------------
PHSRF
Task:  This task will phase-reference all channels to the phase
       of a single channel, or group of channels. Note that CL
       and SN tables are not copied to the output file if
       OPCODE = 'A&P', as in this case all prior calibration becomes
       irrelevant.
Adverbs:
  INNAME.....Input UV file name (name).      Standard defaults.
  INCLASS....Input UV file name (class).     Standard defaults.
  INSEQ......Input UV file name (seq. #).    0 => highest.
  INDISK.....Disk drive # of input UV file.  0 => any.
  SOURCES....Source to be baselined.   '  '=> all; if any starts with
             a '-' then all except ANY source named.   Only one source
             may be done at a time.
  QUAL.......Qualifier of source to be baselined. -1 => all.
  CALCODE....Calibrator code of sources to baseline. ' '=> all.
  TIMERANG...Time range of the data to be copied. In order: Start day,
             hour, min. sec, end day, hour, min. sec. Days relative to
             ref. date.
  SELBAND....Bandwidth of data to be selected. If more than one IF is
             present SELBAND is the width of the first IF required.
             Units = kHz. For data which contain multiple
             bandwidths/frequencies the task will insist that some form
             of selection be made by frequency or bandwidth.
  SELFREQ....Frequency of data to be selected. If more than one IF is
             present SELFREQ is the frequency of the first IF required.
             Units = MHz.
  FREQID.....Frequency identifier to select (you may determine which is
             applicable from the OPTYPE='SCAN' listing produced by
             LISTR). If either SELBAND or SELFREQ are set, their values
             override that of FREQID.  However, setting SELBAND and
             SELFREQ may result in an ambiguity.  In that case, the task
             will request that you use FREQID.
  SUBARRAY...Sub-array number to copy. 0=>all.
  DOCALIB....If true (>0), calibrate the data using information in the
             specified Cal (CL) table for multi-source or SN table for
             single-source data.  Also calibrate the weights unless
             DOCALIB > 99 (use this for old non-physical weights).
  GAINUSE....version number of the CL table to apply to multi-source
             files or the SN table for single source files.
             0 => highest.
  DOPOL......If > 0 then correct data for instrumental polarization as
             represented in the AN or PD table.  This correction is
             only useful if PCAL has been run or feed polarization
             parameters have been otherwise obtained.  See HELP DOPOL
             for available correction modes: 1 is normal, 2 and 3 are
             for VLBI.  1-3 use a PD table if available; 6, 7, 8 are
             the same but use the AN (continuum solution) even if a PD
             table is present.
  PDVER......PD table to apply if PCAL was run with SPECTRAL true and
             0 < DOPOL < 6.  <= 0 => highest.
  BLVER......Version number of the baseline based calibration (BL) table
             to apply. <0 => apply no BL table, 0 => highest.
  FLAGVER....specifies the version of the flagging table to be applied.
              0 => highest numbered table.
             <0 => no flagging to be applied.
  DOBAND.....If true (>0) then correct the data for the shape of the
             antenna bandpasses using the BP table specified by BPVER.
             The correction has five modes:
             (a) if DOBAND=1 all entries for an antenna in the table
             are averaged together before correcting the data.
             (b) if DOBAND=2 the entry nearest in time (including
             solution weights) is used to correct the data.
             (c) if DOBAND=3 the table entries are interpolated in
             time (using solution weights) and the data are then
             corrected.
             (d) if DOBAND=4 the entry nearest in time (ignoring
             solution weights) is used to correct the data.
             (e) if DOBAND=5 the table entries are interpolated in
             time (ignoring solution weights) and the data are then
             corrected.
             IMAGR uses DOBAND as the nearest integer; 0.1 is therefore
             "false".
  BPVER......Specifies the version of the BP table to be applied
                0 => highest numbered table.
               <0 => no bandpass correction to be applied.
  SMOOTH.....Specifies the type of spectral smoothing to be applied to
             a uv database . The default is not to apply any smoothing.
             The elements of SMOOTH are as follows:
             SMOOTH(1) = type of smoothing to apply: 0 => no smoothing
               To smooth before applying bandpass calibration
                 1 => Hanning, 2 => Gaussian, 3 => Boxcar, 4 => Sinc
               To smooth after applying bandpass calibration
                 5 => Hanning, 6 => Gaussian, 7 => Boxcar, 8 => Sinc
             SMOOTH(2) = the "diameter" of the function, i.e. width
               between first nulls of Hanning triangle and sinc
               function, FWHM of Gaussian, width of Boxcar. Defaults
               (if 0.1) are 4, 2, 2 and 3 channels for SMOOTH(1) =
               1 - 4 and 5 - 8, resp.
             SMOOTH(3) = the diameter over which the convolving
               function has value - in channels.  Defaults: 1,3,1,4
               times SMOOTH(2) used when input SMOOTH(3) < net
               SMOOTH(2).
  DOACOR.....> 0 => include autocorrelations as well as cross
             correlation data.
  OUTNAME....Output UV file name (name).     Standard defaults.
  OUTCLASS...Output UV file name (class).    Standard defaults.
  OUTSEQ.....Output UV file name (seq. #).   0 => highest unique
  OUTDISK....Disk drive # of output UV file. 0 => highest with
             space for the file.
  OPCODE.....Define the operation to be performed.
             'PHSR' => perform phase-referencing, rotate the
                 phases of all channels by the average phase of
                 the channel(s) defined by CHANSEL
             'A&P' => same as 'PHSR', but also divides
                 amplitude by that of the reference
             'PHBL' => same as 'PHSR', but write results into
                 BL table. Will always create a new table.
             'APBL' => same as 'A&P', but write results into
                 BL table. Will always create a new table.
  ICHANSEL.. Array of start, stop, and increment channel numbers plus
             an IF used for channel selection in the averaging to
             define the pahse reference feature  Up to 20 sets if
             channels/IF may be entered.  The first having
             ICHANSEL(2,i) <= 0 terminates the list.  ICHANSEL(4,i) is
             the IF number, with <= 0 meaning all IFs.  If an IF has
             no ICHANSEL set for it, the program quits with an error
             condition.  You must select channels.
----------------------------------------------------------------

