; TKAGUESS
;---------------------------------------------------------------
;! Verb to re-plot slice model guess directly on TEK
;# VERB ANALYSIS
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2009
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
TKAGUESS  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
TKAGUESS: Verb to re-plot slice model guess directly on TEK
INNAME                             Image name (name)
INCLASS                            Image name (class)
INSEQ           0.0      9999.0    Image name (seq. #)
INDISK          0.0         9.0    Disk drive #
INVERS          0.0     46655.0    Version # of SL file. 0=>last
IN2VERS         0.0     46655.0    Version # of model. 0 => last
PIXRANGE                           Min,Max of image intensity
                                     Max <= Min => entire range
BDROP           0.0      9999.0    Drop slice pts from beginning
EDROP           0.0      9999.0    Drop slice pts from end
GPOS                               Initial guess of positions.
GMAX                               Initial guess of max values.
GWIDTH                             Initial guess of halfwidths.
----------------------------------------------------------------
TKAGUESS
Type: Verb
Use:  Plot the curve described by the initial guess of the
      gaussian components on top of any existing plot.
Adverbs:
  INNAME......Image name (name).        Standard defaults.
  INCLASS.....Image name (class).       Standard defaults.
  INSEQ.......Image name (seq. #).      0 => highest.
  INDISK......Disk unit #.              0 => any.
  INVERS......Version # of SL file.     0 => highest version #
  PIXRANGE....Min,Max of Image intensity.  0 => entire range
  BDROP.......No of slice pts to omit from beginning of slice.
  EDROP.......No of slice points to omit from end of slice.
  NGAUSS......No of gaussian components.
  GPOS........Initial guess of positions of the components.
  GMAX........Initial guess of maximum amplitudes.
  GWIDTH......Initial guess of widths at 1/2 max amplitudes.
----------------------------------------------------------------
