; ANTUSE
;---------------------------------------------------------------
;! Antennas to include/exclude from the task or verb
;# ADVERB CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 1998-1999, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
ANTUSE  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
ANTUSE
Type: Adverb  (REAL(50))
Use:  Standard data selection adverb, used to specify a list of antennas
      to be included in, or excluded from, an operation.  If any element
      of the array is negative then all antennas given are excluded;
      else all are included.  The antenna numbers used are the absolute
      values of the elements of ANTUSE.
Null Value:  0
      ANTUSE = 0 usually means all antennas.

      ANTUSE is often used to specify the subgroup of antennas having
      been selected by ANTENNAS
Tasks:
  BPEDT.....Interactive TV task to edit uv data based on BP tables.
            ANTUSE selects the antennas in the initial display.
  BSCAN.....Seeks best scan to use for phase cal, fringe search.
            ANTUSE is a list of antennas to be ignored.
  CALIB.....Determines antenna calibration: complex gain.  ANTUSE is a
            list of antennas to be used in determining the mean gain.
  EDITA.....Interactive TV task to edit uv data based on TY/SY/SN/CL
            tables.  ANTUSE selects the antennas in the initial
            display.
  EDITR.....Interactive baseline-oriented visibility editor using the
            TV.  ANTUSE selects the antennas in the initial display.
  PCEDT.....Interactive TV task to edit pulse-cal (PC) tables.
            ANTUSE selects the antennas in the initial display.
  PDEDT.....Interactive TV task to edit polarization D-term (PD)
            tables.  ANTUSE selects the antennas in the initial
            display.
  SNEDT.....Interactive SN/CL/TY/SY table editor using the TV.
            ANTUSE selects the antennas in the initial display.
Procedures:
  IMSCAL....Large image self-cal with IM2CC and OOCAL.  ANTUSE lists the
            antennas to be used to find the mean gain.
  OOCAL.....Determines antenna complex gain with frequency-dependent
            models.  ANTUSE lists the antennas to be used to find the
            mean gain.
----------------------------------------------------------------

