; AXTYPE
;---------------------------------------------------------------
;! Type of coordinate axis
;# ADVERB CATALOG
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
AXTYPE    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
AXTYPE
Type: Adverb    (character * 8)
Use:  To specify the type of axis.  FITS standard types include
      'RA', 'DEC', 'LL', 'MM', 'GLON', 'GLAT', 'ELON', 'ELAT',
      'TIME', 'FREQ', 'LAMBDA', 'VELO', 'STOKES', 'COMPLEX',
      'DISTANCE', 'ANGLE', 'PIXEL'
Null value: none
Verbs:
   ALTDEF........Sets frequency vs velocity relationship into image
                 header.  AXTYPE defines the choice of radio or optical
                 velocity and relative to LSR, heliocentric, or
                 observer.
   AXDEFINE......Define new or alter previous axis description.
                 There is no default for AXTYPE.
Tasks:
   UVHGM.........Plots statistics of uv data files as histogram.
                 AXTYPE selects the physical parameters of up to 8
                 histograms to be plotted.
----------------------------------------------------------------
