; BPARM
;---------------------------------------------------------------
;! general numeric array adverb used too many places
;# ADVERB GENERAL
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2019-2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
BPARM     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
BPARM
Type: Adverb   (Real(10))
Use:  A general adverb which contains ten elements as parameters to some
      process.
Null value:  Usually 0.
      Too many to describe the usage - read help files closely
Procedures:
   IMFRING.......Large image delay fitting with IM2CC and OOFRING.
   IMSCAL........Large image self-cal with IM2CC and OOCAL.
   OOCAL.........Determines antenna complex gain with frequency-dependent
                 models.
   OOFRING.......Fringe fit data to determine calibration with spectral
                 index options.
   VLACLCAL......Runs CLCAL and prints the results with LISTR.
Tasks:
   ACFIT.........Determine antenna gains from autocorrelations.
   AFARS.........Is used after FARS to determine Position and Value of the
                 maximum.
   ANBPL.........Plots and prints uv data converted to antenna based
                 values.
   ATLOD.........Reads ATCA data in RPFITS dormat into AIPS.
   BASRM.........Task to remove a spectral baseline from total power
                 spectra.
   BLCAL.........Compute closure offset corrections.
   BLCHN.........Compute closure offset corrections on a
                 channel-by-channel basis.
   BOXES.........Adds Clean boxes to BOXFILE around sources from a list.
   BPCOR.........Correct BP table.
   BSMOD.........Creates single-dish UV beam-switched data with model
                 sources.
   CAPLT.........Plots closure amplitude and model from CC file.
   CLCAL.........Merges and smooths SN tables, applies them to CL tables.
   CLIP..........Edits data based on amplitudes, phases, and weights out
                 of range.
   CLPLT.........Plots closure phase and model from CC file.
   CLSMO.........Smooths a calibration CL table.
   COMB..........Combines two images by a variety of mathematical methods.
   CONFI.........Optimize array configuration by minimum side lobes.
   CONPL.........Plots AIPS gridding convolution functions.
   CSCOR.........Applies specified corrections to CS tables.
   DFQID.........Modifies UV data changing the indicated FQIDs.
   DFTIM.........Makes image of DFT at arbitrary point showing time vs
                 frequency.
   DFTPL.........Plots DFT of a UV data set at arbitrary point versus
                 time.
   DSORC.........Copies a data set elliminating some source numbers.
   FACES.........Makes images of catalog sources for initial calibration.
   FARAD.........Add ionospheric Faraday rotation to CL table.
   FILLM.........Reads VLA on-line/archive format uv data tapes (post Jan
                 88).
   FIXBX.........Converts a BOXFILE to another for input to IMAGR.
   FLAGR.........Edit data based on internal RMS, amplitudes, weights.
   FLGIT.........Flags data based on the rms of the spectrum.
   FRING.........Fringe fit data to determine antenna calibration, delay,
                 rate.
   FRMAP.........Task to build a map using fringe rate spectra.
   FRPLT.........Task to plot fringe rate spectra.
   FUDGE.........Modifies UV data with user's algorithm: paraform task.
   GLENS.........Models galaxy gravitational lens acting on 3 component
                 source.
   HOLGR.........Read & process holography visibility data to telescope
                 images.
   HOLOG.........Read & process holography visibility data to telescope
                 images.
   INDXR.........Writes index file describing contents of UV data base.
   LAYER.........Task to create an RGB image from multiple images.
   LOCIT.........Fits antenna locations from SN-table data.
   MEDI..........Combines four images by a variety of mathematical
                 methods.
   OOSUB.........Subtracts/divides a model from/into a uv data base.
   PBEAM.........Fits the analytic function to the measured values of the
                 beam.
   PCAL..........Determines instrumental polarization for UV data.
   PCASS.........Finds amplitude bandpass shape from pulse-cal table data.
   PDPLT.........Plots selected contents of PD tables.
   POSSM.........Task to plot total and cross-power spectra.
   REGRD.........Regrids an image from one co-ordinate frame to another.
   REWAY.........Computes weights based in rms in spectra.
   RFI...........Look for RFI in uv data.
   RLDLY.........Fringe fit data to determine antenna R-L delay
                 difference.
   RM2PL.........Plots spectrum of a pixel with RMFIT fit.
   SCIMG.........Full-featured imaging plus self-calibration loop with
                 editing.
   SCMAP.........Imaging plus self-calibration loop with editing.
   SDMOD.........Modifies single-dish UV data with model sources.
   SDTUV.........Task to convert SD table files to UV like data.
   SETFC.........Makes a BOXFILE for input to IMAGR.
   SKYVE.........Regrids a DSS image from one co-ordinate frame to
                 another.
   SNBLP.........Plots selected contents of SN or CL files on a baseline
                 basis.
   SNPLT.........Plots selected contents of SN, SY, TY, PC or CL files
                 versus time.
   SNSMO.........Smooths and filters a calibration SN table.
   STRAN.........Task compares ST tables, find image coordinates (e.g.
                 guide star ).
   SYVSN.........Plots selected SY/TY data with SN solution values versus
                 time.
   TAFLG.........Flags data in a Table extension file.
   TAMRG.........Task to merge table rows under specified conditions.
   TAPLT.........Plots data from a Table extension file.
   TYCOP.........Copy TY or SY table calibration between IFs.
   TYSMO.........Smooths and filters a calibration TY or SY table.
   UVCON.........Generate sample UV coverage given a user defined array
                 layout.
   UVFIL.........Create, fill a uv database from user supplied
                 information.
   UVHIM.........Makes image of the histogram on two user-chosen axes.
   UVPLT.........Plots data from a UV data base in multiple ways.
   UVPRM.........Measures parameters from a UV data base.
   VPLOT.........Plots uv data and model from CC file.
   WETHR.........Plots selected contents of WX tables, flags data based on
                 WX.
   WIPER.........Plots and edits data from a UV data base using the TV.
   XG2PL.........Plots spectrum of a pixel with XGAUS/AGAUS and
                 ZEMAN/ZAMAN fits.
----------------------------------------------------------------
