; CLINT
;---------------------------------------------------------------
;! CL table entry interval
;# ADVERB CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
CLINT     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
CLINT
Type:  Adverb  (scalar)
Use:   This adverb specifies the time interval between
       calibration entries per antenna when creating a new CL
       table. Units of minutes.
Null value:
       0   => depends on task.
Tasks:
   FITLD.......Reads FITS files to load images or UV (IDI or UVFITS)
               data to disk.
"Verbs":
   BDF2AIPS....Read EVLA ASDM/BDF data into AIPS.
Procedures:
   VLBAFIX.....Procedure that fixes VLBA data, if necessary.
   VLBAFQS.....Copies different FQIDS to separate files
   VLBALOAD....Loads VLBA data
   VLBARUN.....Applies amplitude and phase calibration procs to VLBA
               data.  It is the VLBA pipeline.
   VLBASRT.....Sorts VLBA data, if necessary.
   VLBASUBS....Looks for subarrays in VLBA data.
----------------------------------------------------------------
