; CODETYPE
;---------------------------------------------------------------
;! specifies the desired operation or data type
;# ADVERB PLOT CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
CODETYPE  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
CODETYPE
Type: Adverb (String*4)
Use:  To specify the type of data acted upon by a task or other "type"
      parameters.
Null Value: None
Tasks:
   BLPLT.....Plots BLCAL tables in 2 dimensions as function of baseline
             and IF.  CODETYPE specifies what parameter is plotted.
   BPCOR.....Correct BP table.  CODETYPE specifies which data are
             smoothed.
   BPLOT.....Plots bandpass tables in 2 dimensions as function of time.
             CODETYPE spefies the type of data plotted.
   FRPLT.....Task to plot fringe rate spectra.  CODETYPE specifies the
             type of data plotted.
   PCPLT.....Plots pulse-cal tables in 2 dimensions as function of
             time.  CODETYPE specifies the type of data plotted.
   POSSM.....Task to plot total and cross-power spectra.  CODETYPE
             specifies the type of data plotted,
   SETJY.....Task to enter source info into source (SU) table.  CODETYPE
             specifies the new calibrator CALCODE.
----------------------------------------------------------------


