; CTYPE
;---------------------------------------------------------------
;! specifies type of component
;# ADVERB ANALYSIS
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
CTYPE     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
CTYPE
Type: Adverb   (Array(4),  Real*4)
Use:  A general purpose adverb used to specify a type of process in a
      verb or task.
Null value:  0
      Null value assignment usually means 1.
Tasks:
   CCNTR.....Generate a contour plot file from an image with CC or MF
             plotted.  CTYPE controls the symbol type, number, and flux
             range of the Clean or Model components plotted.
   IMFIT.....Fits Gaussians to portions of an image.  CTYPE specifies
             what is fitted for each component (Gaussian, zero level,
             slope, curvature).
   JMFIT.....Fits Gaussians to portions of an image.  CTYPE as IMFIT.
   MF2ST.....Task to generate an ST ext. file from Model Fit ext. file.
             CTYPE controls the symbol type, number, and flux range of
             the Model components to be written as "stars".
   UVMOD.....Modify UV database by adding a model incl spectral index.
             CTYPE is the type of source (Gaussian, disk, etc.).
----------------------------------------------------------------
