; DOBTWEEN
;---------------------------------------------------------------
;! Controls smoothing between sources in calibration tables
;# ADVERB UV CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 2004, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
DOBTWEEN  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
DOBTWEEN
Type: Adverb (Real)
Use:  Controls whether some function is done between some things or
      not.  Current usage has DOBTWEEN > 0 permitting calibration
      solutions from different sources to be smoothed together.  False
      (<= 0) causes calibration data from separate calibrators to be
      kept separate.
Tasks:
  CLCAL.....Merges and smoothes SN tables, applies them to CL tables
  CLSMO.....Smooths a calibration CL table
  PRTAN.....Prints the contents of the ANtenna extension file.
            DOBTWEEN > 0 => print relative antenna positions as well
            as those in the antenna file.
  SNSMO.....Smooths and filters a calibration SN table
  TYSMO.....Smooths and filters a calibration TY or SY table.
Procedures:
  VLACLCAL..Runs CLCAL and prints the results with LISTR.
----------------------------------------------------------------

