; DOCAT
;---------------------------------------------------------------
;! specifies whether the output is saved (cataloged) or not
;# ADVERB CATALOG
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
DOCAT     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
DOCAT
Type: Adverb  (Logical,   > 0  =>  true)
Use:  True (1) means create a cataloged output file.
      False (-1) means do not create a cataloged output file.
Null value:  true (1)
Tasks:
   BSGRD.........Task to image beam-switched single-dish data.  DOCAT
                 applies to the intermediate images.
   FINDR.........Find normal values for a uv data set.  DOCAT true
                 requests that the XX table be retained.
   FLAGR.........Edit data based on internal RMS, amplitudes, weights.
                 DOCAT true requests that the XX table be retained.
   FTFLG.........Interactive flagging of UV data in channel-time using the
                 TV.  DOCAT applies to the work file which may be reused.
   IBLED.........Interactive BaseLine based visibility EDitor.  DOCAT
                 refers to the work file.
   IMEAN.........Displays the mean & extrema and plots histogram of an
                 image.  DOCAT true puts the fit RMS into the header.
   PCFLG.........Interactive flagging of Pulse-cal data in channel-TB
                 using the TV.  DOCAT refers to the work file,
   SPFLG.........Interactive flagging of UV data in channel-TB using the
                 TV.  DOCAT refers to the work file,
   TVFLG.........Interactive flagging of UV data using the TV.
                 DOCAT refers to the work file,
   UVFIT.........Fits source models to uv data.  DOCAT true requests
                 that the results be recorded in a Clean components file.
   UVGIT.........Fits source models to uv data.  DOCAT true requests
                 that the results be recorded in a Clean components file.
----------------------------------------------------------------
