; DOFLAG
;---------------------------------------------------------------
;! Controls closure cutoff in gain solutions and flagging
;# ADVERB calibration editing
;-----------------------------------------------------------------------
;;  Copyright (C) 2004, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
DOFLAG    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
DOFLAG
Type: Adverb (scalar)
Use:  Controls the use of flagging or flagged data in tasks.
Tasks:
  CALIB.....Determines antenna calibration: complex gain
            ABS(DOFLAG) determines the level of closure error
            considered bad at the only non-robust solution or at the
            last iteration of a robest solution.  If DOFLAG > 0, then
            flags are written to a flag table.
  OFLAG.....Uses on-line flag table information to write a flag table.
            Data are flagged if the score is >= DOFLAG.
  PRTAB.....Prints any table-format extension file.  DOFLAG>0 says to
            also list flagged rows.
  PRTOF.....Prints on-line flag table information.  DOFLAG>0 says to
            also list flagged rows.
  RFLAG.....Flags data set based on time and freq rms in fringe
            visibilities.  DOFLAG>0 causes flagging to be done even
            when DOPLOT>0.
  SYSOL.....Undoes and re-does nominal sensitivity application for
            Solar data.  DOFLAG is used to stop flagging of the SY
            and/or SN tables.
  TACOP.....Task to copy tables, other extension files.  DOFLAG>0
            causes flagged rows to be copied.
  TYAPL.....Undoes and re-does nominal sensitivity application.
            DOFLAG is used to stop flagging of the SY/TY and/or SN
            tables.
Procedures:
  IMSCAL....Large image self-cal with IM2CC and OOCAL.  DOFLAG>0
            causes data with excessive closure error to be flagged.
  OOCAL.....Determines antenna complex gain with frequency-dependent
            models.  DOFLAG>0 causes data with excessive closure
            error to be flagged.
  VLBAMPHC..Applies VLBARUN calibration to additional phase stopping
            centers.  DOFLAG>0 causes RFLAG to be applied to the data.
  VLBARUN...Applies amplitude and phase calibration procs to VLBA data.
            DOFLAG>0 causes RFLAG to be applied to the data.
----------------------------------------------------------------
