; DOKEEP
;---------------------------------------------------------------
;! specifies if something is kept or deleted
;# ADVERB GENERAL
;-----------------------------------------------------------------------
;;  Copyright (C) 2012, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
DOKEEP    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
DOKEEP
Type:   Adverb  (logical,  > 0  =>  true)
Use:    Tells a task or procedure to keep something
Null value:  false (<= 0).
Procedures:
  OOCAL........Self-calibration with spectral-dependent corrections
               for primary beam and spectral index.  DOKEEP > 0 =>
               keep the data set which is the input data divided by
               the model.
Tasks:
  FITLD........Reads FITS files to load images or UV (IDI or UVFITS)
               data to disk  DOKEEP > 0 causes fully flagged
               visibilities to be retained.
  FQUBE........Collects n-dimensional images into n+1-dimensional
               FREQID image.  DOKEEP true syas to retain fully blanked
               or missing m-dimensional images.
  PCLOD........Reads ascii file containing pulse-cal info to PC table.
               DOKEEP true says to keep records that are not in any
               scan.
  SLICE........Task to make a slice file from an image.  DOKEEP says
               to make simple slices stay in input pixels rather than
               being heavily interpolated.
  SNREF........Chooses best reference antenna to minimize R-L
               differences.  DOKEEP says to retain all "temporary"
               SN tables (each with different referance antenna).
  UVLOD........Read export or FITS data from a tape or disk.  DOKEEP
               > 0 causes fully flagged visibilities to be retained.
Procedures:
  IMFRING......Large image delay fitting with IM2CC and OOFRING,
               DOKEEP true says to keep the divided data set.
  IMSCAL.......Large image self-cal with IM2CC and OOCAL.  DOKEEP
               true says to retain the divided data set.
  OOCAL........Determines antenna complex gain with frequency-dependent
               models.  DOKEEP true says to keep the divided data set.
----------------------------------------------------------------
