; DOMAX
;---------------------------------------------------------------
;! selects solutions for maxima of models
;# ADVERB ANALYSIS
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
DOMAX     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
DOMAX
Type  Adverb   (Logical(4),  > 0  =>  true)
Use:  A logical array, dimension (4), associated with GMAX, the
      initial guess of the peak amplitude of a set of Gaussians.
      > 0 => Let parameter vary.   <= 0 -> Keep parameter fixed.
Null Value:  true (all 1).
Tasks:
   IMFIT.........Fits Gaussians to portions of an image.  Returns in
                 DOMAX the error bars in the fit.
   JMFIT.........Fits Gaussians to portions of an image.  Returns in
                 DOMAX the error bars in the fit.
   SLFIT.........Task to fit gaussians to slice data.  Returns in
                 DOMAX the error bars in the fit.
   UVFIT.........Fits source models to uv data.  DOMAX is used only
                 if INLIST is blank.
   UVGIT.........Fits source models to uv data.  DOMAX is used only
                 if INLIST is blank.
----------------------------------------------------------------
