; DOROBUST
;---------------------------------------------------------------
;! Controls method of averaging - simple mean/rms or robust
;# ADVERB UV EDITING
;-----------------------------------------------------------------------
;;  Copyright (C) 2011, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
DOROBUST  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
DOROBUST
Type: Adverb (Real)
Use:  Controls whether a function uses robust methods to determine the
      mean and rms or a simple, single-pass method including all data
      samples.
Default:
      default is 1, > 0 => use robust methods.
Tasks:
  FLAGR.....Edit data based on internal RMS, amplitudes, weights
            DOROBUST controls the averaging across each spectrum
  FINDR.....Find normal values for a uv data set (to guide the use of
            FLAGR).  DOROBUST controls the averaging across each
            spectrum.
  UVIMG.....Grid UV data into an "image".  If DOROBUST > 0, then
            uniform weighting with AIPS standard ROBUST is done.
Procedures:
  CXIMAGR...Grid UV data into a complex image, Fourier transform,
            Clean - calls UVIMG.
----------------------------------------------------------------
