; DOWAIT
;---------------------------------------------------------------
;! selects wait-for-completion mode for running tasks
;# ADVERB GENERAL
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
DOWAIT    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
DOWAIT
Type: Adverb (logical,  > 0  =>  true)
Use:  True means that the interactive version of AIPS should not resume
      until the task being activated has finished.  False means resume
      AIPS as soon as possible.  With the OBIT-access "verbs" below (all
      listed except GO), the messages from OBIT may appear on the user's
      terminal depending on the setting of DOCRT.
Null value:   false (-1).
Verbs:
   BDF2AIPS......Read EVLA ASDM/BDF data into AIPS.
   BDFLIST.......List contents of EVLA ASD data file.
   GO............Starts a task, detaching it from AIPS or AIPSB.
   OBITIMAG......Access to OBIT task Imager without self-cal or peeling.
   OBITMAP.......Simplified access to OBIT task Imager.
   OBITPEEL......Access to OBIT task Imager with self-cal and peeling.
   OBITSCAL......Access to OBIT task Imager with self-cal, NOT peeling.
----------------------------------------------------------------
