; FWIDTH
;---------------------------------------------------------------
;! gives widths of model components - results of fitting
;# ADVERB ANALYSIS
;-----------------------------------------------------------------------
;;  Copyright (C) 2004, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
FWIDTH    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
FWIDTH
Type: Adverb   (Real(3,4))
Use:  An array, dimension (3,4), containing the fit results for the
      (Major axis, Minor axis, Position angle) of the Gaussian
      component.  The units are (pixels, pixels,degrees).
Null Value: none
Tasks:
   IMFIT.....Fits gaussians to portions of an image - FWIDTH is
             returned adverb with fit results.
   IMMOD.....Adds images of model objects to an image.  FWIDTH is an
             input adverb with component widths unless there is an input
             text file with models.
   JMFIT.....Fits gaussians to portions of an image - FWIDTH is
             returned adverb with fit results.
   SLFIT.....Task to fit gaussians to slice data.  FWIDTH is a returned
             adverb with fit results.
   UVMOD.....Modify UV database by adding a model incl spectral index.
             FWIDTH is an  input adverb with component widths unless
             there is an input text file with models.
----------------------------------------------------------------
