; GETITIME
;---------------------------------------------------------------
;! Verb to return the UV data integration time.
;# Verb UV Editing
;-----------------------------------------------------------------------
;;  Copyright (C) 2019-2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
GETITIME  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
GETITIME:  Verb to return the UV data integration time
INNAME                             UV data name(name).
INCLASS                            UV data name(class).
INSEQ           0.0      9999.0    UV data name(seq. #).0=>high
INDISK          0.0         9.0    Disk drive #. 0=>any
BPRINT          0.0                UV data record number to use
INTTIME                            Integration time in seconds
----------------------------------------------------------------
GETITIME
Type: Verb
Use:  Returns the data set integration time in seconds if that time is
      available as a random parameter ("INTTIM").  This random
      parameter should be available on all VLB data sets and all
      modern (EVLA) data sets.  Use PRTUV to decide for yourself what
      the integration time might be on old VLA data sets.
Adverbs:
  INNAME......UV data set name(name).   Standard defaults.
  INCLASS.....UV data set name(class).  Standard defaults.
  INSEQ.......UV data set name(seq. #).  0 => highest.
  INDISK......Disk drive # of image.  0 => any.
  BPRINT......Can be used to select which data record is used to set
              the integration time.   <= 0 -> 1.
Output adverb
  INTTIME.....Data set integration time in seconds.
----------------------------------------------------------------
