; GMAX
;---------------------------------------------------------------
;! specifies peak values of model components
;# ADVERB ANALYSIS
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
GMAX      LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
GMAX
Type: Adverb   (Real(4))
Use:  An array, dimension (4), containing the initial guess of the peak
      amplitude of up to four Gaussian components.  Units of
      1-dimensional (slice) fits depend on LTYPE (use TVSET).
Null Value:  0
      No default typically.
Verbs:
   MFITSET.......Gets adverbs for running IMFIT and JMFIT.
   SET1DG........Verb to set 1D gaussian fitting initial guesses.
   TK1SET........Verb to reset 1D gaussian fitting initial guess.
   TKAGUESS......Verb to add a plot of the slice model guess directly on
                 TEK.
   TKGUESS.......Verb to display slice model guess directly on TEK.
   TKSET.........Verb to set 1D gaussian fitting initial guesses.
   TV1SET........Verb to reset 1D gaussian fitting initial guess on TV
                 plot.
   TVAGUESS......Verb to re-plot slice model guess directly on TV
                 graphics.
   TVGUESS.......Verb to display slice model guess directly on TV
                 graphics.
   TVSET.........Verb to set slice Gaussian fitting initial guesses from
                 TV plot.  Highly recommended to get the units right.
Tasks:
   BSMOD.........Creates single-dish UV beam-switched data with model
                 sources.
   BSTST.........Graphical display of solutions to frequency-switched
                 data.
   IMFIT.........Fits Gaussians to portions of an image.
   JMFIT.........Fits Gaussians to portions of an image.
   SDMOD.........Modifies single-dish UV data with model sources.
   SLFIT.........Task to fit gaussians to slice data.
   UVFIT.........Fits source models to uv data.
   UVGIT.........Fits source models to uv data.
----------------------------------------------------------------
