; IN2VERS
;---------------------------------------------------------------
;! specifies the version number of the 2nd input extension file
;# ADVERB CATALOG
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
IN2VERS   LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
IN2VERS
Type: Adverb (Real)
Use:  Version number associated with an extension file
      associated with IN2NAME, IN2CLASS, IN2SEQ, IN2EXT.
Null Value:  0
      Null value usually means take the highest version number.
Tasks:
  CAPLT......Plots closure amplitude and model from CC file.
             IN2VERS is the Clean component version number.
  CL2HF......Convert CL table to HF (Haystack format) table
             IN2VERS is the CL table version for phase cal.
  CLPLT......Plots closure phase and model from CC file.
             IN2VERS is the Clean component version number.
  FGCNT......Counts samples comparing two flag tables.
             IN2VERS is the flag table version of the "after"
             count coumt of data.
  GREYS......Plots images as contours over multi-level grey.
             IN2VERS is the first Slice file whose locations are
             to be overplotted.
  LPCAL......Determines instrumental polarization for UV data
             IN2VERS is the first Clean component version number.
  PDPLT......Plots selected contents of PD tables.
             IN2VERS is the PD table version of the 2nd data set.
  SL2PL......Task to convert a Slice File to a Plot File.
             IN2VERS is the version number of the model.
  SLPRT......Task to print a Slice File,
             IN2VERS is the version number of the model.
  STRAN......Task compares ST tables, find image coordinates (e.g. guide star).
             IN2VERS is the version of the ST table with star coordinates.
  SYSOL......Undoes and re-does nominal sensitivity application for Solar data.
             IN2VERS is the SY table version to be applied to the data.
  TADIF......Prints differences between two table-format extension files.
             IN2VERS is the version number of the second data set table.
  TAPPE......Task to append 2 tables and merge to output table.
             IN2VERS is the version number of the 2nd input table.
  TBDIF......Compare entries in two tables.
             IN2VERS is the version number of the second data set table.
  TYAPL......Undoes and re-does nominal sensitivity application
             IN2VERS is the TY or SY table version to be applied to the data.
  VLAMP......Makes ANTAB file for phased VLA used in VLBI observations.
             IN2VERS is the version of the input GC table.
  VPLOT......Plots uv data and model from CC file.
             IN2VERS is the input Clean components table version number.
  XG2PL......Plots spectrum of a pixel with XGAUS/AGAUS and ZEMAN/ZAMAN fits.
             IN2VERS is the Zeeman (ZE) table version number.
  ZAMAN......Fits 1-dimensional Zeeman model to absorption-line data.
             IN2VERS is the input XGAUS (XG) table version.
  ZEMAN......Fits 1-dimensional Zeeman model to data.
             IN2VERS is the input XGAUS (XG) table version.
Verbs:
  TKAMODEL...Verb to add slice model display directly on TEK.
             IN2VERS is the version number of the model.
  TKARESID...Verb to add slice model residuals directly on TEK.
             IN2VERS is the version number of the model.
  TKMODEL....Verb to display slice model directly on TEK.
             IN2VERS is the version number of the model.
  TKRESID....Verb to display slice model residuals directly on TEK.
             IN2VERS is the version number of the model.
  TVACOMPS...Verb to add slice model components directly on TV graphics.
             IN2VERS is the version number of the model.
  TVAMODEL...Verb to add slice model display directly on TV graphics.
             IN2VERS is the version number of the model.
  TVARESID...Verb to add slice model residuals directly on TV graphics.
             IN2VERS is the version number of the model.
  TVCOMPS....Verb to display slice model components directly on TV graphics.
             IN2VERS is the version number of the model.
  TVMODEL....Verb to display slice model directly on TV graphics.
             IN2VERS is the version number of the model.
  TVRESID....Verb to display slice model residuals directly on TV graphics.
             IN2VERS is the version number of the model.
----------------------------------------------------------------
Verbs:
   TKAMODEL......Verb to add slice model display directly on TEK.
   TKARESID......Verb to add slice model residuals directly on TEK.
   TKMODEL.......Verb to display slice model directly on TEK.
   TKRESID.......Verb to display slice model residuals directly on TEK.
   TVACOMPS......Verb to add slice model components directly on TV
                 graphics.
   TVAMODEL......Verb to add slice model display directly on TV graphics.
   TVARESID......Verb to add slice model residuals directly on TV
                 graphics.
   TVCOMPS.......Verb to display slice model components directly on TV
                 graphics.
   TVMODEL.......Verb to display slice model directly on TV graphics.
   TVRESID.......Verb to display slice model residuals directly on TV
                 graphics.
Tasks:
   CAPLT.........Plots closure amplitude and model from CC file.
   CL2HF.........Convert CL table to HF table.
   CLPLT.........Plots closure phase and model from CC file.
   FGCNT.........Counts samples comparing two flag tables.
   GREYS.........Plots images as contours over multi-level grey.
   LPCAL.........Determines instrumental polarization for UV data.
   PDPLT.........Plots selected contents of PD tables.
   SL2PL.........Task to convert a Slice File to a Plot File.
   SLPRT.........Task to print a Slice File.
   STRAN.........Task compares ST tables, find image coordinates (e.g.
                 guide star ).
   SYSOL.........Undoes and re-does nominal sensitivity application for
                 Solar data.
   TADIF.........Prints differences between two table-format extension
                 files.
   TAPPE.........Task to append 2 tables and merge to output table.
   TBDIF.........Compare entries in two tables.
   TYAPL.........Undoes and re-does nominal sensitivity application.
   VLAMP.........Makes ANTAB file for phased VLA used in VLBI
                 observations.
   VPLOT.........Plots uv data and model from CC file.
   XG2PL.........Plots spectrum of a pixel with XGAUS/AGAUS and
                 ZEMAN/ZAMAN fits.
   ZAMAN.........Fits 1-dimensional Zeeman model to absorption-line data.
   ZEMAN.........Fits 1-dimensional Zeeman model to data.
