; NOBAT
;---------------------------------------------------------------
;! Task to lock lower priority users out of the AP
;# TASK AP
;-----------------------------------------------------------------------
;;  Copyright (C) 1995
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
NOBAT     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
NOBAT:  Task to lock lower priority users out of the AP
DETIME           1.0      60.0     Length of time (min) to run.
----------------------------------------------------------------
NOBAT
Type:  Task
Use:   NOBAT is used to keep other AIPS users with higher AIPS
       numbers from getting much time on the AP.  NOBAT is on
       the list of AP tasks that the a task trying to get the
       AP looks for.  If a NOBAT with a lower AIPS number is
       running, an AP task will wait an amount of time
       proportional to its AIPS number before making a request
       for the AP.  NOTE: NOBAT isn't actually assigned the AP.
       It does nothing but sit there in a hibernate state.
Adverbs:
  DETIME.....The length of time for NOBAT to run. (min.)
----------------------------------------------------------------
