; OUT2DISK
;---------------------------------------------------------------
;! The disk number of a secondary output file.
;# ADVERB CATALOG IMAGING
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
OUT2DISK  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
OUT2DISK
Type:  Adverb  (Read)
Use:   Disk number associated with the secondary output file
Null value:  0
       Null value means use any disk having enough space. Usually the
       routines look first on the highest numbered disk and proceed
       downward in disk number if needed.

Tasks:
   HUINT.........Make RGB image from images of intensity & hue, like
                 TVHUEINT.  The second output is the wedge image.
   RFARS.........Correct Q/U cubes for Faraday rotation synthesis results.
                 The second output image if the imaginary part,
   SCIMG.........Full-featured imaging plus self-calibration loop with
                 editing.  The second output is the calibrated UV data.
   SCMAP.........Imaging plus self-calibration loop with editing.  The
                 second output is the calibrated UV data.
   TVHUI.........Make TV image from images of intensity, hue, saturation.
                 The second output is the wedge image.
   UTESS.........Deconvolves images by maximizing emptiness.  The second
                 output is the convolved version of the first output
                 image.
   VTESS.........Deconvolves sets of images by the Maximum Entropy Method.
                 The second output is the convolved version of the first
                 output image.
----------------------------------------------------------------
