; OUT2SEQ
;---------------------------------------------------------------
;! The sequence of a secondary output file.
;# ADVERB CATALOG IMAGING
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
OUT2SEQ   LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
OUT2SEQ
Type: Adverb  (Real)
Use:  Data files are stored in AIPS under logical names which have 3
      parts: a 12-character "name" field, a 6-character "class" field,
      and a numeric "sequence number" field.  OUT2SEQ is used to specify
      the "sequence number" field for the secondary output data file
      from a verb or task.  It is used as an integer number between -1
      and 9999.
Null values:  0 and -1
      -1 means to use the same sequence number as that found for the
      first input image (actual INSEQ with null value filled in).  0
      means find the image having the highest sequence number which is
      consistent with the other output name adverb parameters and use a
      sequence number 1 higher.  If there is no such image, then use
      OUTSEQ of 1.  The phrase "0 => highest unique", used a lot in Help
      files, is intended to be a code for this standard default behavior.

Tasks:
   HUINT.........Make RGB image from images of intensity & hue, like
                 TVHUEINT.  The second output is the wedge image.
   RFARS.........Correct Q/U cubes for Faraday rotation synthesis results.
                 The second output image if the imaginary part,
   SCIMG.........Full-featured imaging plus self-calibration loop with
                 editing.  The second output is the calibrated UV data.
   SCMAP.........Imaging plus self-calibration loop with editing.  The
                 second output is the calibrated UV data.
   TVHUI.........Make TV image from images of intensity, hue, saturation.
                 The second output is the wedge image.
   UTESS.........Deconvolves images by maximizing emptiness.  The second
                 output is the convolved version of the first output
                 image.
   VTESS.........Deconvolves sets of images by the Maximum Entropy Method.
                 The second output is the convolved version of the first
                 output image.
----------------------------------------------------------------
