; PMODEL
;---------------------------------------------------------------
;! Polarization model parameters
;# ADVERB POLARIZATION
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
PMODEL    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
PMODEL
Type: Adverb  (REAL(7))
Use:  This adverb specifies a source polarization model of a single
      point source:
                PMODEL(1) = I flux density (Jy)
                PMODEL(2) = Q flux density (Jy)
                PMODEL(3) = U flux density (Jy)
                PMODEL(4) = V flux density (Jy)
                PMODEL(5) = X offset in sky (arcsec)
                PMODEL(6) = Y offset in sky (arcsec)
Null Value:  0
      A null value of PMODEL(1) means no single-component model is
      specified;
Tasks:
   FRCAL.....Faraday rotation self calibration task.
   MAPBM.....Map VLA beam polarization.
   PCAL......Determines instrumental polarization for UV data.
   RLCAL.....Determines instrumental right-left phase versus time (a
             self-cal).
----------------------------------------------------------------
