; PVPLOT
;---------------------------------------------------------------
;! selects a display of a polarization vector in a box in a corner
;# ADVERB PLOT
;-----------------------------------------------------------------------
;;  Copyright (C) 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
PVPLOT    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
PVPLOT
Type:  Adverb  (Scalar)
Use:   Used by plot tasks to control whether and where a polarization
       vector will be plotted.  The usual values mean
                  0: no vector plot
                  1: lower left corner
                  2: lower right corner
                  3: upper right corner
                  4: upper left corner
                  5: plots the VECTOR in a separate pane (KNTR)
       Grey scales, contours, and polarization vectors are not
       drawn in the vector scale box.  Plots are labeled with the
       flux that corresponds to the vector drawn.
Null value:  0 -> no vector scale plot
Tasks:
   KNTR.....Make a contour and/or grey-scale plot file from one
            or two images with multiple panels possible.  Polarization
            vectors may be plotted.
   PCNTR....Make a contour and/or grey-scale plot with polarization
            vectors.  Muti-channel contours may be overlayed in
            different colors.
----------------------------------------------------------------
