; SAMPTYPE
;---------------------------------------------------------------
;! Specifies sampling type
;# ADVERB CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
SAMPTYPE  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
SAMPTYPE
Type: Adverb (String*4)
Use:  To specify the type of smoothing to be done.  Allowed values can
      include 'BOX', 'MWF', 'GAUS', 'EXP', 'LINE', '2PT', '2PTH'
Null Value: None
Tasks:
   CLCAL......Merges and smooths SN tables, applies them to CL tables.
              SAMPTYPE specifies the type of smoothing function over
              time.
   CLSMO......Smooths a calibration CL table.  SAMPTYPE specifies the
              type of smoothing function over time.
   SNSMO......Smooths and filters a calibration SN table.  SAMPTYPE
              specifies the type of smoothing function over time.
   SYVSN......Plots selected SY/TY data with SN solution values versus
              time.  SAMPTYPE specifies the type of smoothing function.
   TVSPC......Display images and spectra from a cube.  SAMPTYPE
              specifies the type of smoothing function over frequency.
   TYSMO......Smooths and filters a calibration TY or SY table.
              SAMPTYPE specifies the type of smoothing function over
              time.
Procedures:
   VLACLCAL...Runs CLCAL and prints the results with LISTR.  SAMPTYPE
              is passed to CLCAL.
----------------------------------------------------------------
