; SMODEL
;---------------------------------------------------------------
;! Source model
;# ADVERB CALIBRATION IMAGING
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2003, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
SMODEL    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
SMODEL
Type: Adverb  (REAL(7))
Use:  This model specifies a point source model to use, usually instead
      of a Clean components model.  A non-zero flux density means this
      model is to be used if  appropriate. The elements of SMODEL are
          SMODEL(1) = flux density (Jy)
          SMODEL(2) = X offset in sky (arcsec)
          SMODEL(3) = Y offset in sky (arcsec)
          SMODEL(4) = Model type:
            0 => point model
            1 => elliptical Gaussian and
                 SMODEL(5) = major axis size (arcsec)
                 SMODEL(6) = minor axis size (arcsec)
                 SMODEL(7) = P. A. of major axis (degrees)
            2 => uniform sphere and
                 SMODEL(5) = radius (arcsec)
            3 => uniform sphere and
                 SMODEL(5) = radius (arcsec)

Null Value:  0
      A null value of SMODEL(1) means no model is specified;
      the useage of null values for other parameters depend on
      the application.
Tasks:
   BLCAL......Compute closure offset corrections.
   BLCHN......Compute closure offset corrections on a channel-by-channel
              basis.
   BPASS......Computes spectral bandpass correction table.
   CALIB......Determines antenna calibration: complex gain.
   CPASS......Computes polynomial spectral bandpass correction table.
   EVAUV......Subtracts & divides a model into UV data, does statistics
              on results.
   FRING......Fringe fit data to determine antenna calibration, delay,
              rate.
   KRING......Fringe fit data to determine antenna calibration, delay,
              rate.
   OOSUB......Subtracts/divides a model from/into a uv data base.
   SCIMG......Full-featured imaging plus self-calibration loop with
              editing.
   SCMAP......Imaging plus self-calibration loop with editing.
   UVADC......Fourier transforms and corrects a model and adds to uv
              data.
   UVCON......Generate sample UV coverage given a user defined array
              layout.
   UVSUB......Subtracts/divides a model from/into a uv data base.
Procedures:
   OOCAL......Determines antenna complex gain with frequency-dependent
              models.
   OOFRING....Fringe fit data to determine calibration with spectral
              index options.
   VLBABPSS...Computes spectral bandpass correction table.
----------------------------------------------------------------
