; SOLCON
;---------------------------------------------------------------
;! Gain solution constraint factor
;# ADVERB CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
SOLCON    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
SOLCON
Type:  Adverb  (scalar)
Use:   This adverb specified the gain constraint factor;
       a value larger than 0 will increase the strength of the
       amplitude constraint in gain constrained solution with
       SOLMODE=4 and SOLTYPE=2.
Null value: 0
Tasks:
   CALIB.....Determines antenna calibration: complex gain.
   GAL.......Determine parameters from a velocity field.  SOLCON sets
             the convergence criterion.
   SCIMG.....Full-featured imaging plus self-calibration loop with
             editing.
   SCMAP.....Imaging plus self-calibration loop with editing.
Procedures:
   IMSCAL....Large image self-cal with IM2CC and OOCAL,
   OOCAL.....Determines antenna complex gain with frequency-dependent
             models.
----------------------------------------------------------------
