; SOLINT
;---------------------------------------------------------------
;! Solution interval
;# ADVERB CALIBRATION
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
SOLINT    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
SOLINT
Type:  Adverb  (scalar)
Use:   This adverb specifies the time interval to use in determining
       calibration parameters or to average before plotting in minutes.
Null value:
       0   => often scan average but depends on task.
Procedures:
   CRSFRING......Procedure to calibrate cross pol. delay and phase
                 offsets.
   IMFRING.......Large image delay fitting with IM2CC and OOFRING.
   IMSCAL........Large image self-cal with IM2CC and OOCAL.
   OOCAL.........Determines antenna complex gain with frequency-dependent
                 models.
   OOFRING.......Fringe fit data to determine calibration with spectral
                 index options.
   PEELR.........Calibrates interfering sources in multi-facet imges.
   VLBACPOL......Procedure to calibrate cross-polarization delays.
   VLBACRPL......Plots crosscorrelations.
   VLBAFRGP......Fringe fit phase referenced data and apply calibration.
   VLBAFRNG......Fringe fit data and apply calibration.
   VLBAKRGP......Fringe fit phase referenced data and apply calibration.
   VLBAKRNG......Fringe fit data and apply calibration.
   VLBARUN.......Applies amplitude and phase calibration procs to VLBA
                 data.
Tasks:
   ACCOR.........Corrects cross amplitudes using auto correlation
                 measurements.
   ACFIT.........Determine antenna gains from autocorrelations.
   ACSCL.........Corrects cross amplitudes using auto correlation
                 measurements.
   ALVAR.........Plots the Allan Variance statistic of a UV data set.
                 SOLINT is the basic integration time of the data in sec.
   ALVPR.........Prints statistics on the Allan Variance of a UV data set.
                 SOLINT is the basic integration time of the data in sec.
   ANBPL.........Plots and prints uv data converted to antenna based
                 values.  SOLINT is the data averaging interval.
   APCAL.........Apply TY and GC tables to generate an SN table.
   ATMCA.........Determines delay/phase gradient from calibrator
                 observations.
   BLAVG.........Average cross-polarized UV data over baselines.
                 SOLINT is the pre-averaging interval.
   BLCAL.........Compute closure offset corrections.
   BLING.........Find residual rate and delay on individual baselines.
   BPASS.........Computes spectral bandpass correction table.
   CALIB.........Determines antenna calibration: complex gain.
   CAPLT.........Plots closure amplitude and model from CC file.
   CLPLT.........Plots closure phase and model from CC file.
   CPASS.........Computes polynomial spectral bandpass correction table.
   DEFLG.........Edits data based on decorrelation over channels and time.
                 SOLINT is the averaging time in seconds to compare
                 vector and scalar averages.
   DIFUV.........Outputs the difference of two matching input uv data
                 sets.  SOLINT is the maximum time difference to compare
                 data values.
   EDITA.........Interactive TV task to edit uv data based on TY/SY/SN/CL
                 tables.  Times within SOLINT are treated as equal.
   EDITR.........Interactive baseline-oriented visibility editor using the
                 TV.  Times within SOLINT are treated as equal.
   FGSPW.........Flags bad spectral windows.
   FINDR.........Find normal values for a uv data set.  SOLINT is the
                 interval over which the rms is determined.
   FIXWT.........Modify weights to reflect amplitude scatter of data.
                 SOLINT is the interval over which the rms is determined.
   FLAGR.........Edit data based on internal RMS, amplitudes, weights.
                 SOLINT is the interval over which the rms is determined.
   FLGIT.........Flags data based on the rms of the spectrum.
                 SOLINT is the interval over which the rms is determined.
   FRCAL.........Faraday rotation self calibration task.
   FRING.........Fringe fit data to determine antenna calibration, delay,
                 rate.
   FRPLT.........Task to plot fringe rate spectra.  SOLINT is the
                 interval for each plot; 0 -> all times.
   KRING.........Fringe fit data to determine antenna calibration, delay,
                 rate.
   LPCAL.........Determines instrumental polarization for UV data.
   OMFIT.........Fits sources and, optionally, a self-cal model to uv
                 data.
   PCAL..........Determines instrumental polarization for UV data.
   PCAVG.........Averages pulse-cal (PC) tables over time.
   PCFIT.........Finds delays and phases using a pulse-cal (PC) table.
   PLOTC.........Plots color schems used by 3-color plot tasks.
   POSSM.........Task to plot total and cross-power spectra.
   RFI...........Look for RFI in uv data.  SOLINT is the time interval
                 over which the rms is determined in seconds.
   RLCAL.........Determines instrumental right-left phase versus time (a
                 self-cal).
   RLDLY.........Fringe fit data to determine antenna R-L delay
                 difference.
   SCIMG.........Full-featured imaging plus self-calibration loop with
                 editing.
   SCMAP.........Imaging plus self-calibration loop with editing.
   SNEDT.........Interactive SN/CL/TY/SY table editor using the TV.
                 Times within SOLINT are treated as equal.
   SNIFS.........Plots selected contents of SN, TY, SY, PC or CL files by
                 IF.
   SPCAL.........Determines instrumental polzn. for spec. line UV data.
   SPLAT.........Applies calibration and splits or assemble selected
                 sources.
   SPRMS.........Plots spectral statistics of a selected subset of a uv
                 data set.
   TBAVG.........Time averages data combining all baselines.
   UVMLN.........Edits data based on the rms of the spectrum.
   UVRMS.........Computes statistics of a selected subset of a uv data
                 set.
   VPLOT.........Plots uv data and model from CC file.
----------------------------------------------------------------
