; TKAMODEL
;---------------------------------------------------------------
;! Verb to add slice model display directly on TEK
;# VERB ANALYSIS ONED MODELING PLOT
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2009
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
TKAMODEL  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
TKAMODEL: Verb to add slice model display directly on TEK
INNAME                             Image name (name)
INCLASS                            Image name (class)
INSEQ           0.0      9999.0    Image name (seq. #)
INDISK          0.0         9.0    Disk drive #
INVERS          0.0     46655.0    Version # of SL file. 0=>last
IN2VERS         0.0     46655.0    Version # of model. 0 => last
PIXRANGE                           Min,Max of image intensity
                                     Max <= Min => entire range
BDROP           0.0      9999.0    Drop slice pts from beginning
EDROP           0.0      9999.0    Drop slice pts from end
----------------------------------------------------------------
TKAMODEL
Type: Verb
Use:  TKAMODEL will add a display of gaussian model of a
      slice file on to the TEK 4012 device.
Adverbs:
  INNAME......Image name (name).        Standard defaults.
  INCLASS.....Image name (class).       Standard defaults.
  INSEQ.......Image name (seq. #).      0 => highest.
  INDISK......Disk unit #.              0 => any.
  INVERS......Version # of SL file.     0 => highest version #
  IN2VERS.....Version # of model file.  0 => last version.
  PIXRANGE....Min,Max of Image intensity.  0 => entire range
  BDROP.......No of slice pts to omit from beginning of plot.
  EDROP.......No of slice points to omit from end of plot.
----------------------------------------------------------------
