; UNCAL
;---------------------------------------------------------------
;! sets up tables for uncalibrating Australia Telescope data
;# Task Calibration
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
UNCAL     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
UNCAL     Task to set up tables for uncalibrating AT data
INNAME                             Input UV file name (name)
INCLASS                            Input UV file name (class)
INSEQ             0.0     9999.0   Input UV file name (seq. #)
INDISK            0.0        9.0   Input UV file disk unit #
INEXT                              2 character code to determine
                                   which table is to be copied.
                                   Valid values = 'CU' or 'BU',
                                   '  ' = 'CU'
INVERS                             Version of input table to use
----------------------------------------------------------------
UNCAL
Task: To take the CU and BU tables generated at the Australia
      Telescope and turn them into CL and BP tables. This is
      done because the CU and BP tables contain the inverse of
      the corrections applied on-line and therefore to undo the
      on-line calibration the user just applies the CL and BP
      tables generated by UNCAL.  Effectively, all that UNCAL
      does is rename the '*U' tables to either CL or BP tables.
  INNAME.....Input UV file name (name).      Standard defaults.
  INCLASS....Input UV file name (class).     Standard defaults.
  INSEQ......Input UV file name (seq. #).    0 => highest.
  INDISK.....Disk drive # of input UV file.  0 => any.
  INEXT......2 character code specifiying which table is to be
             copied. 'CU' will copy a 'CU' table to a 'CL' table
             'BU' will generate a 'BP' table. '  ' => 'CU'
  INVERS.....Version number of the specified input table to use.
----------------------------------------------------------------
