; UVCOPPRM
;---------------------------------------------------------------
;! Parameter adverb array for task UVCOP
;# ADVERB UV
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
UVCOPPRM  LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
UVCOPPRM
Type: Adverb   (Real(10))
Use:  The task specific parameters for UVCOP.
Null value:  Usually 0.
Tasks:
  UVCOP:  Copies a selected subset (or all) of a uv data file.
Details:

  (1) > 0 tells the program to copy fully flagged data, otherwise they
      are dropped.
  (2) > 0 tells the program to drop all distinctions between subarrays
      (not advised).
  (3) tells the program which type of data to copy;
         0 => copy all data types
         1 => copy only cross-power data
         2 => copy only total-power data.
  (4) > 0 keeps you informed about UVCOP progress, listing every
      10,000th visibility and associated time stamp.
  (5) => used to set a lower limit for allowed weights.  Any data with
      weights < UVCOPPRM(5) will be flagged and if the whole record ends
      up flagged it will be copied only if UVCOPPRM(1) > 0.
      ** WARNING: THIS OPTION CHANGED 21-JUL-2011.  It used to omit
      records if all weights in all channels and IFs were less than
      UVCOPPRM(5) but did not flag anything.  Now it flags all low
      weights and passes the data on with the flags unless all
      correlators are now flagged.
  (6) >0 => if flagging is applied to the UV data, it is applied by
      default to SN, SY, and TY tables.  To stop that, set UVCOPPRM(6)
      as a bit pattern -
         values 1 and 3 => do NOT flag SY/TY tables,
         values 2 and 3 => do NOT flag SN tables.
  (7) => Tables are copied from the specified begin time minus
      UVCOPPRM(7) minutes to the specified end time plus UVCOPPRM(7)
      minutes.  This is to include CL table and SN table points for
      interpolation purposes.  0 -> 15 minutes.  If you do not want this
      extension, set UVCOPPRM(7) less than zero or to something very
      small like 0.0001.
  (8) > 0 => this is holography data - do not scale the u,v,w of the
      holography sources for frequency
----------------------------------------------------------------
