; ZEROSP
;---------------------------------------------------------------
;! Specify how to include zero spacing fluxes in FT of UV data
;# ADVERB UV IMAGING
;-----------------------------------------------------------------------
;;  Copyright (C) 1995, 2019-2020
;;  Associated Universities, Inc. Washington DC, USA.
;;
;;  This program is free software; you can redistribute it and/or
;;  modify it under the terms of the GNU General Public License as
;;  published by the Free Software Foundation; either version 2 of
;;  the License, or (at your option) any later version.
;;
;;  This program is distributed in the hope that it will be useful,
;;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;;  GNU General Public License for more details.
;;
;;  You should have received a copy of the GNU General Public
;;  License along with this program; if not, write to the Free
;;  Software Foundation, Inc., 675 Massachusetts Ave, Cambridge,
;;  MA 02139, USA.
;;
;;  Correspondence concerning AIPS should be addressed as follows:
;;         Internet email: aipsmail@nrao.edu.
;;         Postal address: AIPS Project Office
;;                         National Radio Astronomy Observatory
;;                         520 Edgemont Road
;;                         Charlottesville, VA 22903-2475 USA
;-----------------------------------------------------------------------
;---------------------------------------------------------------
ZEROSP    LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
----------------------------------------------------------------
ZEROSP
Type:  Adverb (Real array, 5 elements)
Use:  Specify parameters to include zero spacing fluxes in the Fourier
      transform of UV data.  ZEROSP(1) and perhaps 2,3,4  give the
      flux and ZEROSP(5) gives a weight.

Null value:  NONE

Procedures:
   LINIMAGE......Build image cube from multi-IF data set.
   MAPPR.........Simplified access to IMAGR.
Tasks:
   IMAGR.........Wide-field and/or wide-frequency Cleaning / imaging task.
   SCIMG.........Full-featured imaging plus self-calibration loop with
                 editing.
   SCMAP.........Imaging plus self-calibration loop with editing.
   SETJY.........Task to enter source info into source (SU) table.
   UVMAP.........Makes images from calibrated UV data.
   UVMOD.........Modify UV database by adding a model incl spectral index.
----------------------------------------------------------------
